Gabor 96.968-67 Black Combi Mesh

Vendor: Gabor
Type: Ladies Trainers
Price: 91.00

Gabor 96.968-67 Black Combi suede & Mesh trainers that are oh so comfortable. The Gabor Rolling soft shoes feature a black mesh upper with velvety finish. The lace up front ensures an adjustable fastening whilst the zips allow for quick foot entry. Padding around the collar offers superb comfort whilst the cushioned foot bed provides support underfoot. Gabor have used their Rolling Soft technology, designed to mimic the foot's natural movement and provides additional support and stability. This Gabor trainer is equipped with a removable foot bed so that you can wear your orthotics if necessary.