SUAVE DAISY 10 Blue

Vendor: Suave
Type: Ladies Sandals
Price: 40.00

SUAVE DAISY 10 Blue

Suave are super comfortable and they are made in Portugal super soft leathers and light flexibly soles.

They feature an adjustable Velcro strap for best fit and a flexible wedge sole unit with removable insoles if you need to wear your custom insoles.
Heel Height : 5 Cm